%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{TheSnowLeopardConservancy2003} The Snow Leopard Conservancy. (2003). \textit{Local People{\textquoteright}s Attitudes toward Wildlife Conservation in the Hemis National Park, with Special Reference to the Conservation of Large Predators} (Vol. 7). Sonoma, California.

\end{thebibliography}

\end{document}

